= Standards that define ciphersuites
Stefan Schumacher <public@cryptomancer.de>
v0.0.1, 2026/04/17, draft
// :doctype: book
:experimental:
:source-highlighter: rouge
:rouge-style: github
:stem: latexmath
:toc: macro
:sectnums: all
:toclevels: 4 
:sectnumlevels: 3
:html5s-image-default-link: self
:icons: image
:note-caption: ℹ️ 
:tip-caption: 💡
:important-caption: ❗
:caution-caption: 🔥 
:warning-caption: ⚠️
// ☢️

ifdef::backend-pdf[]
:icons: font
endif::backend-pdf[]

*{author}* <{email}>

toc::[]

* compiled at {localdate}  {localtime}  Version {revnumber} of {revdate}
* *Datei*: {docname}  

Scope: This document will list all standards that define the properties of ciphersuites (algorithm, key length, mode)
etc. The aim is to generate an exhaustive list of cryptographic material to be used as a database for CBOMs. 

== Taxonomy Dimensions

. Status 
.. Approved
.. Obsolete / Deprecated
.. Legacy
. Protocols
.. TLS
.. OpenSSH
.. IPSec
.. Wireguard
.. GnuPG 
.. Kerberos
.. JWT
. Symmetric
. Asymmetric
. Key Exchang
. Key Length
.. 56, 128, 196, 256
. Operation Mode
. IANA CipherSuite
. Hash
.. MAC


